0 50 100 150 200 250 300 350 400 450 500 60

80

100

120

140

160

180

200

220

240

260

Degree of minority over-sampling

Decisiion tree size (Number of nodes)

Pruned decision tree size vs the degree of minority over-sampling

Synthetic data Replicated data